45 50 55 60 65 70 75 80 85 90

100 200 300 400 500 600 meters a) DEPTH OF ISOPYCNALS

45 50 55 60 65 70 75 80 85 90 -3 -2 -1 0 1 2 3

time (years) normalized b) POTENTIAL VORTICITY

model observed